From 909b9462da8387e1c8379a52058c61bf18e222e5 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Nils=20Wallm=C3=A9nius?= <nils@rockbox.org>
Date: Sat, 3 Mar 2007 00:07:31 +0000
Subject: Update the manual to reflect recent menu changes, add descriptions of
 how to move and remove tracks in the playlist viewer, Recording settings are
 now in their own chapter.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@12553 a1c6a512-1295-4272-9138-f99709370657
---
 manual/main_menu/recording_screen.tex | 56 +++++++++++++++++++++++++++++++++++
 1 file changed, 56 insertions(+)
 create mode 100644 manual/main_menu/recording_screen.tex

(limited to 'manual/main_menu/recording_screen.tex')

diff --git a/manual/main_menu/recording_screen.tex b/manual/main_menu/recording_screen.tex
new file mode 100644
index 0000000000..7ae4205abd
--- /dev/null
+++ b/manual/main_menu/recording_screen.tex
@@ -0,0 +1,56 @@
+% $Id$ %
+\section{\label{ref:Recording}Recording}
+\subsection{\label{ref:while_recording_screen}While Recording Screen}
+\screenshot{main_menu/images/ss-while-recording-screen}{The while recording
+  screen}{}
+
+Entering the \setting{Recording} option in the \setting{Main Menu} brings up
+a screen in which you can choose to enter the \setting{Recording Screen} or
+the \setting{Recording Settings} (see below). The \setting{Recording Screen}
+shows the time elapsed and the size of the file being recorded. A peak meter
+is present to allow you set gain correctly. There is also a volume setting,
+this will only affect the output level of the \dap{} and does \emph{not}
+affect the recorded sound.
+\opt{SWCODEC}{
+\note{When you start a recording, the hard disk will spin up. This will cause
+the peak meters to freeze in the process. This is expected behaviour, and
+nothing to worry about. The recording continues during the spin up.}}
+\opt{MASCODEC}{The frequency, channels and quality}
+\opt{SWCODEC}{The frequency and channels} settings are shown on the last line.
+
+The controls for this screen are:
+\begin{table}
+  \begin{btnmap}{}{}
+    
+    \ActionStdPrev{} / \ActionStdNext & Select setting.\\
+    %
+    \ActionSettingsDec{} / \ActionSettingsInc & Adjust selected setting.\\
+    %
+    \ActionRecPause & Start recording.\\
+                    & While recording: pause recording (press again to
+                      continue).\\
+    %
+    \ActionRecExit  & Exit \setting{Recording Screen}.\\
+                    & While recording: Stop recording.\\
+    %
+    \opt{IRIVER_H100_PAD,IRIVER_H300_PAD,IAUDIO_X5_PAD}{
+      \ActionRecNewfile & Starts recording.\\
+                        & While recording: close the current file and open
+                          a new one.\\
+    }
+    %
+    \ActionRecMenu & Open \setting{Recording Settings} (see below).\\
+    %
+    \opt{RECORDER_PAD}{
+      \ActionRecFTwo & Quick menu for recording settings. A quick press will
+      leave the screen up (press \ActionRecFTwo{} again to exit), while holding
+      it will close the screen when you release it.\\
+    }
+    %
+    \opt{RECORDER_PAD}{
+      \ActionRecFThree & Quick menu for source setting.\\
+      & Quick/hold works as for \ActionRecFTwo.\\
+      & While recording: Start a new recording file.\\
+    }
+  \end{btnmap}
+\end{table}
-- 
cgit v1.2.3

