From 4752798b58dd89d794a5c3824f2e45d1958bd7e9 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Rafa=C3=ABl=20Carr=C3=A9?= <rafael.carre@gmail.com>
Date: Sat, 12 Jun 2010 21:17:03 +0000
Subject: fuzev2 manual: mention the USB OF setting

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@26823 a1c6a512-1295-4272-9138-f99709370657
---
 manual/getting_started/installation.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/getting_started/installation.tex')

diff --git a/manual/getting_started/installation.tex b/manual/getting_started/installation.tex
index 8d73d4b938..fefa847c02 100644
--- a/manual/getting_started/installation.tex
+++ b/manual/getting_started/installation.tex
@@ -145,7 +145,7 @@ follow the instructions at
     \nopt{sansaAMS}{\warn{Never extract files to your \dap{} while it is in recovery mode.}}
   }
 
-  \opt{fuze,clipplus}{
+  \opt{fuze,fuzev2,clipplus}{
     \note{The following steps require you to change the setting in
     \setting{Settings $\rightarrow$ System Settings $\rightarrow$ USB Mode} to
     \setting{MSC} from within the original firmware.}
-- 
cgit v1.2.3

