From 1e51477ffed558e650be50c14e1281e19d5c3b55 Mon Sep 17 00:00:00 2001
From: Marcoen Hirschberg <marcoen@gmail.com>
Date: Fri, 27 Apr 2007 19:38:16 +0000
Subject: add a note that you can clear the settings on the Gigabeat by holding
 A during boot

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@13281 a1c6a512-1295-4272-9138-f99709370657
---
 manual/advanced_topics/main.tex | 4 ++++
 1 file changed, 4 insertions(+)

(limited to 'manual/advanced_topics/main.tex')

diff --git a/manual/advanced_topics/main.tex b/manual/advanced_topics/main.tex
index e99dbb6f7d..f0172a2810 100644
--- a/manual/advanced_topics/main.tex
+++ b/manual/advanced_topics/main.tex
@@ -356,6 +356,10 @@ Example of a configuration file:
       by turning off the \dap, and turning it	back on with the hold button 
       on.}
   }
+  \opt{gigabeat}{\note{You can also reset all settings to their default values 
+      by turning off the \dap, and turning it back on with the \ButtonA 
+      button on.}
+  }
 			
 \item [Write .cfg file.]This option writes a \fname{.cfg} file to 
   your \daps\ hard disk.  The configuration file has the \fname{.cfg} 
-- 
cgit v1.2.3

